+----------+----------+------------+-----------------+------------------+---------------+
| BIN      | UNIT QTY | BIN VOLUME | ASSIGNED VOLUME | AVAILABLE VOLUME | PERCENT AVAIL |
+----------+----------+------------+-----------------+------------------+---------------+
| LOADDOCK | 97214    | 4200       | 308             | 3892             | 92.67         |
| RDA2B18  | 25       | 280        | 0               | 280              | 100.00        |
| RDA2B20  | 30       | 210        | 125             | 85               | 40.48         |
| RDUA1B10 | 29       | 269        | 18              | 251              | 93.31         |
| RDUA1B11 | 16       | 280        | 63              | 217              | 77.50         |
| RDUA1B13 | 21       | 280        | 40              | 240              | 85.71         |
| RDUA1B15 | 9        | 280        | 23              | 257              | 91.79         |
| RDUA1B25 | 1        | 280        | 4               | 276              | 98.57         |
| RM1A1B1  | 33       | 182        | 87              | 95               | 52.20         |
| RM1A1B10 | 26       | 176        | 44              | 132              | 75.00         |
| RM1A1B11 | 11       | 168        | 0               | 168              | 100.00        |
| RM1A1B12 | 19       | 176        | 48              | 128              | 72.73         |
| RM1A1B13 | 10       | 168        | 56              | 112              | 66.67         |
| RM1A1B14 | 19       | 176        | 26              | 150              | 85.23         |
| RM1A1B15 | 18       | 168        | 31              | 137              | 81.55         |
| RM1A1B16 | 20       | 176        | 38              | 138              | 78.41         |
| RM1A1B17 | 27       | 199        | 117             | 82               | 41.21         |
| RM1A1B18 | 20       | 105        | 66              | 39               | 37.14         |
| RM1A1B19 | 8        | 105        | 0               | 105              | 100.00        |
| RM1A1B2  | 5        | 105        | 26              | 79               | 75.24         |
| RM1A1B21 | 24       | 240        | 40              | 200              | 83.33         |
| RM1A1B23 | 30       | 240        | 41              | 199              | 82.92         |
| RM1A1B3  | 46       | 159        | 44              | 115              | 72.33         |
| RM1A1B4  | 8        | 122        | 30              | 92               | 75.41         |
| RM1A1B5  | 37       | 363        | 29              | 334              | 92.01         |
| RM1A1B6  | 21       | 100        | 29              | 71               | 71.00         |
| RM1A1B7  | 11       | 105        | 34              | 71               | 67.62         |
| RM1A1B8  | 26       | 176        | 65              | 111              | 63.07         |
| RM1A1B9  | 21       | 189        | 26              | 163              | 86.24         |
| RM1A2B1  | 16       | 100        | 47              | 53               | 53.00         |
| RM1A2B10 | 14       | 160        | 42              | 118              | 73.75         |
| RM1A2B11 | 18       | 176        | 28              | 148              | 84.09         |
| RM1A2B12 | 22       | 160        | 32              | 128              | 80.00         |
| RM1A2B2  | 13       | 200        | 0               | 200              | 100.00        |
| RM1A2B3  | 28       | 176        | 59              | 117              | 66.48         |
| RM1A2B4  | 15       | 160        | 29              | 131              | 81.88         |
| RM1A2B5  | 22       | 176        | 28              | 148              | 84.09         |
| RM1A2B6  | 8        | 160        | 45              | 115              | 71.88         |
| RM1A2B7  | 22       | 176        | 42              | 134              | 76.14         |
| RM1A2B8  | 18       | 160        | 77              | 83               | 51.88         |
| RM1A2B9  | 20       | 176        | 45              | 131              | 74.43         |
| RM1A3B1  | 23       | 160        | 77              | 83               | 51.88         |
| RM1A3B10 | 35       | 220        | 67              | 153              | 69.55         |
| RM1A3B11 | 16       | 160        | 74              | 86               | 53.75         |
| RM1A3B2  | 32       | 220        | 83              | 137              | 62.27         |
| RM1A3B3  | 22       | 160        | 18              | 142              | 88.75         |
| RM1A3B4  | 33       | 220        | 64              | 156              | 70.91         |
| RM1A3B5  | 26       | 160        | 110             | 50               | 31.25         |
| RM1A3B6  | 25       | 160        | 48              | 112              | 70.00         |
| RM1A3B7  | 29       | 160        | 15              | 145              | 90.63         |
| RM1A3B8  | 36       | 220        | 46              | 174              | 79.09         |
| RM1A3B9  | 21       | 160        | 83              | 77               | 48.13         |
| RM1A4B1  | 18       | 220        | 21              | 199              | 90.45         |
| RM1A4B10 | 17       | 180        | 77              | 103              | 57.22         |
| RM1A4B12 | 20       | 180        | 32              | 148              | 82.22         |
| RM1A4B14 | 26       | 180        | 60              | 120              | 66.67         |
| RM1A4B2  | 14       | 101        | 4               | 97               | 96.04         |
| RM1A4B3  | 24       | 220        | 40              | 180              | 81.82         |
| RM1A4B4  | 24       | 180        | 91              | 89               | 49.44         |
| RM1A4B5  | 16       | 160        | 63              | 97               | 60.62         |
| RM1A4B6  | 18       | 180        | 50              | 130              | 72.22         |
| RM1A4B7  | 18       | 220        | 28              | 192              | 87.27         |
| RM1A4B8  | 14       | 180        | 24              | 156              | 86.67         |
| RM1A4B9  | 15       | 220        | 0               | 220              | 100.00        |
| RM1A5B1  | 5        | 105        | 0               | 105              | 100.00        |
| RM1A5B10 | 28       | 168        | 24              | 144              | 85.71         |
| RM1A5B11 | 17       | 180        | 0               | 180              | 100.00        |
| RM1A5B12 | 14       | 168        | 55              | 113              | 67.26         |
| RM1A5B13 | 26       | 180        | 66              | 114              | 63.33         |
| RM1A5B14 | 38       | 168        | 87              | 81               | 48.21         |
| RM1A5B15 | 13       | 180        | 22              | 158              | 87.78         |
| RM1A5B16 | 27       | 199        | 31              | 168              | 84.42         |
| RM1A5B18 | 31       | 230        | 112             | 118              | 51.30         |
| RM1A5B2  | 18       | 210        | 18              | 192              | 91.43         |
| RM1A5B22 | 42       | 126        | 25              | 101              | 80.16         |
| RM1A5B24 | 24       | 168        | 61              | 107              | 63.69         |
| RM1A5B4  | 26       | 168        | 0               | 168              | 100.00        |
| RM1A5B5  | 25       | 180        | 85              | 95               | 52.78         |
| RM1A5B6  | 29       | 168        | 52              | 116              | 69.05         |
| RM1A5B7  | 10       | 180        | 33              | 147              | 81.67         |
| RM1A5B8  | 26       | 185        | 0               | 185              | 100.00        |
| RM1A5B9  | 19       | 180        | 84              | 96               | 53.33         |
| RM2A1B1  | 14       | 140        | 56              | 84               | 60.00         |
| RM2A1B10 | 16       | 100        | 13              | 87               | 87.00         |
| RM2A1B11 | 4        | 168        | 0               | 168              | 100.00        |
| RM2A1B13 | 19       | 252        | 118             | 134              | 53.17         |
| RM2A1B2  | 11       | 100        | 29              | 71               | 71.00         |
| RM2A1B3  | 17       | 157        | 0               | 157              | 100.00        |
| RM2A1B4  | 9        | 100        | 16              | 84               | 84.00         |
| RM2A1B5  | 21       | 230        | 115             | 115              | 50.00         |
| RM2A1B6  | 14       | 100        | 12              | 88               | 88.00         |
| RM2A1B7  | 24       | 210        | 89              | 121              | 57.62         |
| RM2A1B8  | 14       | 100        | 34              | 66               | 66.00         |
| RM2A2B1  | 10       | 100        | 14              | 86               | 86.00         |
| RM2A2B2  | 14       | 100        | 19              | 81               | 81.00         |
| RM2A2B3  | 16       | 100        | 61              | 39               | 39.00         |
| RM2A2B4  | 8        | 100        | 14              | 86               | 86.00         |
| RM2A2B5  | 10       | 100        | 44              | 56               | 56.00         |
| RM2A2B6  | 15       | 100        | 8               | 92               | 92.00         |
| RM2A2B7  | 11       | 100        | 39              | 61               | 61.00         |
| RM2A2B8  | 17       | 100        | 13              | 87               | 87.00         |
| RM2A2B9  | 11       | 100        | 51              | 49               | 49.00         |
| RM2A3B1  | 12       | 100        | 0               | 100              | 100.00        |
| RM2A3B10 | 17       | 100        | 15              | 85               | 85.00         |
| RM2A3B12 | 16       | 100        | 21              | 79               | 79.00         |
| RM2A3B14 | 14       | 100        | 10              | 90               | 90.00         |
| RM2A3B16 | 10       | 100        | 35              | 65               | 65.00         |
| RM2A3B18 | 12       | 100        | 0               | 100              | 100.00        |
| RM2A3B2  | 16       | 100        | 37              | 63               | 63.00         |
| Rm2A3B3  | 17       | 100        | 82              | 18               | 18.00         |
| RM2A3B4  | 6        | 100        | 22              | 78               | 78.00         |
| RM2A3B5  | 14       | 100        | 20              | 80               | 80.00         |
| RM2A3B6  | 8        | 100        | 17              | 83               | 83.00         |
| RM2A3B7  | 15       | 100        | 34              | 66               | 66.00         |
| RM2A3B8  | 8        | 100        | 0               | 100              | 100.00        |
| RM2A4B1  | 16       | 100        | 21              | 79               | 79.00         |
| RM2A4B10 | 18       | 240        | 12              | 228              | 95.00         |
| RM2A4B11 | 11       | 100        | 3               | 97               | 97.00         |
| RM2A4B12 | 23       | 192        | 18              | 174              | 90.63         |
| RM2A4B13 | 14       | 100        | 33              | 67               | 67.00         |
| RM2A4B14 | 8        | 192        | 34              | 158              | 82.29         |
| RM2A4B15 | 14       | 100        | 0               | 100              | 100.00        |
| RM2A4B17 | 13       | 100        | 34              | 66               | 66.00         |
| RM2A4B2  | 13       | 240        | 0               | 240              | 100.00        |
| RM2A4B3  | 15       | 100        | 32              | 68               | 68.00         |
| RM2A4B4  | 22       | 168        | 41              | 127              | 75.60         |
| RM2A4B5  | 17       | 100        | 23              | 77               | 77.00         |
| RM2A4B7  | 16       | 100        | 31              | 69               | 69.00         |
| RM2A4B8  | 18       | 192        | 49              | 143              | 74.48         |
| RM2A4B9  | 8        | 100        | 0               | 100              | 100.00        |
| RM2A5B1  | 65       | 504        | 161             | 343              | 68.06         |
| RM2A5B2  | 10       | 576        | 21              | 555              | 96.35         |
| RM3A1B1  | 39       | 380        | 57              | 323              | 85.00         |
| RM3A1B2  | 33       | 330        | 71              | 259              | 78.48         |
| RM3A1B3  | 24       | 320        | 11              | 309              | 96.56         |
| RM3A1B5  | 28       | 240        | 33              | 207              | 86.25         |
| RM3A1B7  | 20       | 220        | 24              | 196              | 89.09         |
| RM3A1B9  | 26       | 160        | 69              | 91               | 56.88         |
| RM3A2B1  | 10       | 120        | 37              | 83               | 69.17         |
| RM3A2B2  | 28       | 320        | 110             | 210              | 65.63         |
| RM3A2B3  | 21       | 120        | 54              | 66               | 55.00         |
| RM3A2B4  | 21       | 240        | 0               | 240              | 100.00        |
| RM3A2B5  | 14       | 170        | 0               | 170              | 100.00        |
| RM3A2B6  | 22       | 220        | 54              | 166              | 75.45         |
| RM3A2B7  | 25       | 210        | 31              | 179              | 85.24         |
| RM3A2B9  | 29       | 160        | 31              | 129              | 80.63         |
| RM3A3B1  | 14       | 120        | 0               | 120              | 100.00        |
| RM3A3B10 | 13       | 110        | 80              | 30               | 27.27         |
| RM3A3B11 | 15       | 100        | 28              | 72               | 72.00         |
| RM3A3B12 | 15       | 154        | 40              | 114              | 74.03         |
| RM3A3B13 | 13       | 100        | 19              | 81               | 81.00         |
| RM3A3B14 | 19       | 176        | 77              | 99               | 56.25         |
| RM3A3B15 | 19       | 100        | 49              | 51               | 51.00         |
| RM3A3B17 | 8        | 100        | 7               | 93               | 93.00         |
| RM3A3B18 | 15       | 125        | 0               | 125              | 100.00        |
| RM3A3B19 | 12       | 100        | 12              | 88               | 88.00         |
| RM3A3B21 | 16       | 100        | 46              | 54               | 54.00         |
| RM3A3B22 | 11       | 120        | 3               | 117              | 97.50         |
| RM3A3B23 | 26       | 240        | 3               | 237              | 98.75         |
| RM3A3B24 | 29       | 215        | 40              | 175              | 81.40         |
| RM3A3B25 | 11       | 216        | 3               | 213              | 98.61         |
| RM3A3B26 | 30       | 180        | 50              | 130              | 72.22         |
| RM3A3B27 | 27       | 160        | 87              | 73               | 45.63         |
| RM3A3B3  | 18       | 128        | 39              | 89               | 69.53         |
| RM3A3B5  | 17       | 125        | 30              | 95               | 76.00         |
| RM3A3B6  | 14       | 231        | 0               | 231              | 100.00        |
| RM3A3B7  | 12       | 100        | 20              | 80               | 80.00         |
| RM3A3B8  | 24       | 264        | 21              | 243              | 92.05         |
| RM3A3B9  | 9        | 100        | 0               | 100              | 100.00        |
| RM3A4B1  | 12       | 144        | 7               | 137              | 95.14         |
| RM3A4B10 | 13       | 100        | 11              | 89               | 89.00         |
| RM3A4B11 | 27       | 144        | 30              | 114              | 79.17         |
| RM3A4B12 | 15       | 100        | 59              | 41               | 41.00         |
| RM3A4B14 | 21       | 100        | 16              | 84               | 84.00         |
| RM3A4B16 | 19       | 100        | 67              | 33               | 33.00         |
| RM3A4B18 | 20       | 100        | 14              | 86               | 86.00         |
| RM3A4B2  | 22       | 128        | 91              | 37               | 28.91         |
| RM3A4B20 | 7        | 100        | 20              | 80               | 80.00         |
| RM3A4B22 | 17       | 100        | 52              | 48               | 48.00         |
| RM3A4B23 | 23       | 144        | 50              | 94               | 65.28         |
| RM3A4B24 | 21       | 198        | 27              | 171              | 86.36         |
| RM3A4B25 | 22       | 144        | 25              | 119              | 82.64         |
| RM3A4B26 | 14       | 198        | 22              | 176              | 88.89         |
| RM3A4B28 | 18       | 160        | 38              | 122              | 76.25         |
| RM3A4B29 | 20       | 144        | 0               | 144              | 100.00        |
| RM3A4B3  | 23       | 144        | 86              | 58               | 40.28         |
| RM3A4B31 | 31       | 144        | 121             | 23               | 15.97         |
| RM3A4B4  | 17       | 128        | 28              | 100              | 78.13         |
| RM3A4B5  | 18       | 144        | 0               | 144              | 100.00        |
| RM3A4B6  | 16       | 125        | 7               | 118              | 94.40         |
| RM3A4B7  | 20       | 144        | 47              | 97               | 67.36         |
| RM3A4B8  | 20       | 100        | 30              | 70               | 70.00         |
| RM3A4B9  | 22       | 144        | 74              | 70               | 48.61         |
| RM3A5B10 | 15       | 144        | 0               | 144              | 100.00        |
| RM3A5B11 | 22       | 144        | 9               | 135              | 93.75         |
| RM3A5B12 | 16       | 144        | 26              | 118              | 81.94         |
| RM3A5B13 | 18       | 144        | 61              | 83               | 57.64         |
| RM3A5B14 | 16       | 144        | 60              | 84               | 58.33         |
| RM3A5B15 | 2        | 90         | 0               | 90               | 100.00        |
| RM3A5B16 | 18       | 144        | 60              | 84               | 58.33         |
| RM3A5B17 | 26       | 162        | 77              | 85               | 52.47         |
| RM3A5B18 | 5        | 144        | 0               | 144              | 100.00        |
| RM3A5B19 | 30       | 162        | 59              | 103              | 63.58         |
| RM3A5B2  | 13       | 144        | 0               | 144              | 100.00        |
| RM3A5B20 | 17       | 144        | 38              | 106              | 73.61         |
| RM3A5B21 | 18       | 162        | 60              | 102              | 62.96         |
| RM3A5B3  | 21       | 240        | 73              | 167              | 69.58         |
| RM3A5B4  | 12       | 144        | 6               | 138              | 95.83         |
| RM3A5B5  | 31       | 200        | 121             | 79               | 39.50         |
| RM3A5B6  | 12       | 144        | 19              | 125              | 86.81         |
| RM3A5B7  | 15       | 200        | 0               | 200              | 100.00        |
| RM3A5B8  | 20       | 144        | 62              | 82               | 56.94         |
| RM3A5B9  | 23       | 200        | 34              | 166              | 83.00         |
| RM3A6B1  | 8        | 288        | 0               | 288              | 100.00        |
| RM3A6B10 | 23       | 200        | 88              | 112              | 56.00         |
| RM3A6B11 | 1        | 105        | 0               | 105              | 100.00        |
| RM3A6B12 | 1        | 105        | 4               | 101              | 96.19         |
| RM3A6B13 | 32       | 240        | 60              | 180              | 75.00         |
| RM3A6B14 | 17       | 225        | 84              | 141              | 62.67         |
| RM3A6B15 | 35       | 220        | 107             | 113              | 51.36         |
| RM3A6B17 | 43       | 561        | 22              | 539              | 96.08         |
| RM3A6B18 | 23       | 225        | 136             | 89               | 39.56         |
| RM3A6B2  | 18       | 200        | 35              | 165              | 82.50         |
| RM3A6B4  | 11       | 200        | 6               | 194              | 97.00         |
| RM3A6B5  | 9        | 288        | 17              | 271              | 94.10         |
| RM3A6B6  | 17       | 200        | 19              | 181              | 90.50         |
| RM3A6B7  | 22       | 200        | 30              | 170              | 85.00         |
| RM3A6B8  | 13       | 200        | 51              | 149              | 74.50         |
| RM3A6B9  | 35       | 275        | 76              | 199              | 72.36         |
| RM3A7B1  | 18       | 320        | 17              | 303              | 94.69         |
| RM3A7B2  | 12       | 200        | 25              | 175              | 87.50         |
| RM3A7B3  | 20       | 360        | 116             | 244              | 67.78         |
| RM3A7B4  | 31       | 275        | 38              | 237              | 86.18         |
| RM3A7B5  | 25       | 560        | 129             | 431              | 76.96         |
| RM3A7B7  | 9        | 100        | 7               | 93               | 93.00         |
| RM3A7B8  | 8        | 240        | 18              | 222              | 92.50         |
| RM4A1B1  | 64       | 240        | 191             | 49               | 20.42         |
| RM4A1B3  | 28       | 432        | 109             | 323              | 74.77         |
| RM4A1B5  | 29       | 312        | 148             | 164              | 52.56         |
| RM4A2B10 | 9        | 100        | 0               | 100              | 100.00        |
| RM4A2B12 | 12       | 100        | 0               | 100              | 100.00        |
| RM4A2B8  | 23       | 100        | 47              | 53               | 53.00         |
| RM4A3B10 | 6        | 100        | 40              | 60               | 60.00         |
| RM4A3B11 | 14       | 100        | 30              | 70               | 70.00         |
| RM4A3B12 | 6        | 100        | 40              | 60               | 60.00         |
| RM4A3B13 | 15       | 100        | 32              | 68               | 68.00         |
| RM4A3B2  | 14       | 200        | 64              | 136              | 68.00         |
| RM4A3B4  | 14       | 190        | 26              | 164              | 86.32         |
| RM4A3B6  | 28       | 440        | 51              | 389              | 88.41         |
| RM4A3B7  | 20       | 100        | 60              | 40               | 40.00         |
| RM4A3B8  | 34       | 440        | 33              | 407              | 92.50         |
| RM4A3B9  | 11       | 100        | 45              | 55               | 55.00         |
| RM4A4B1  | 6        | 100        | 29              | 71               | 71.00         |
| RM4A4B10 | 23       | 260        | 68              | 192              | 73.85         |
| RM4A4B2  | 21       | 216        | 0               | 216              | 100.00        |
| RM4A4B3  | 6        | 100        | 29              | 71               | 71.00         |
| RM4A4B4  | 20       | 216        | 0               | 216              | 100.00        |
| RM4A4B5  | 5        | 100        | 6               | 94               | 94.00         |
| RM4A4B8  | 30       | 190        | 85              | 105              | 55.26         |
| RM6-2    | 143      | 1440       | 264             | 1176             | 81.67         |
| RM6-3    | 77       | 576        | 82              | 494              | 85.76         |
| RM6A1B1  | 34       | 216        | 43              | 173              | 80.09         |
| RM6A1B10 | 12       | 100        | 52              | 48               | 48.00         |
| RM6A1B11 | 17       | 168        | 56              | 112              | 66.67         |
| RM6A1B12 | 20       | 100        | 60              | 40               | 40.00         |
| RM6A1B14 | 15       | 100        | 47              | 53               | 53.00         |
| RM6A1B16 | 14       | 100        | 31              | 69               | 69.00         |
| RM6A1B2  | 9        | 144        | 0               | 144              | 100.00        |
| RM6A1B3  | 9        | 192        | 19              | 173              | 90.10         |
| RM6A1B4  | 6        | 100        | 28              | 72               | 72.00         |
| RM6A1B5  | 17       | 192        | 0               | 192              | 100.00        |
| RM6A1B6  | 9        | 100        | 6               | 94               | 94.00         |
| RM6A1B7  | 16       | 192        | 54              | 138              | 71.88         |
| RM6A1B8  | 3        | 100        | 19              | 81               | 81.00         |
| RM6A2B1  | 10       | 144        | 0               | 144              | 100.00        |
| RM6A2B11 | 16       | 100        | 44              | 56               | 56.00         |
| RM6A2B13 | 13       | 100        | 6               | 94               | 94.00         |
| RM6A2B15 | 15       | 100        | 34              | 66               | 66.00         |
| RM6A2B2  | 14       | 240        | 18              | 222              | 92.50         |
| RM6A2B3  | 10       | 100        | 9               | 91               | 91.00         |
| RM6A2B4  | 17       | 216        | 7               | 209              | 96.76         |
| RM6A2B5  | 14       | 100        | 28              | 72               | 72.00         |
| RM6A2B6  | 5        | 192        | 0               | 192              | 100.00        |
| RM6A2B7  | 19       | 100        | 38              | 62               | 62.00         |
| RM6A2B8  | 20       | 192        | 28              | 164              | 85.42         |
| RM6A2B9  | 17       | 100        | 11              | 89               | 89.00         |
| RM6A3B1  | 7        | 240        | 12              | 228              | 95.00         |
| RM6A3B10 | 6        | 384        | 16              | 368              | 95.83         |
| RM6A3B2  | 20       | 240        | 52              | 188              | 78.33         |
| RM6A3B3  | 16       | 216        | 54              | 162              | 75.00         |
| RM6A3B4  | 25       | 320        | 0               | 320              | 100.00        |
| RM6A3B6  | 44       | 384        | 101             | 283              | 73.70         |
| RM6A3B8  | 82       | 384        | 139             | 245              | 63.80         |
| RM7A1B1  | 24       | 270        | 173             | 97               | 35.93         |
| RM7A1B11 | 62       | 100        | 27              | 73               | 73.00         |
| RM7A1B3  | 25       | 270        | 19              | 251              | 92.96         |
| RM7A1B5  | 7        | 100        | 0               | 100              | 100.00        |
| RM7A1B7  | 18       | 100        | 30              | 70               | 70.00         |
| RM7A1B9  | 9        | 100        | 13              | 87               | 87.00         |
| RM7A2B10 | 15       | 100        | 49              | 51               | 51.00         |
| RM7A2B12 | 9        | 100        | 46              | 54               | 54.00         |
| RM7A2B2  | 38       | 270        | 40              | 230              | 85.19         |
| RM7A2B4  | 33       | 270        | 0               | 270              | 100.00        |
| RM7A2B6  | 14       | 100        | 45              | 55               | 55.00         |
| RM7A2B7  | 36       | 270        | 25              | 245              | 90.74         |
| RM7A2B8  | 8        | 100        | 25              | 75               | 75.00         |
| RM7A2B9  | 28       | 270        | 32              | 238              | 88.15         |
| RM7A3B1  | 16       | 288        | 52              | 236              | 81.94         |
| RM7A3B2  | 25       | 448        | 24              | 424              | 94.64         |
| RM7A3B3  | 8        | 256        | 0               | 256              | 100.00        |
| RM7A3B5  | 28       | 352        | 0               | 352              | 100.00        |
| RM7A3B6  | 19       | 270        | 23              | 247              | 91.48         |
| RM7A3B7  | 30       | 240        | 57              | 183              | 76.25         |
| RM7A3B8  | 28       | 410        | 36              | 374              | 91.22         |
| RM7A3B9  | 18       | 128        | 26              | 102              | 79.69         |
| RM8A1B1  | 48       | 338        | 96              | 242              | 71.60         |
| RM8A1B3  | 41       | 338        | 74              | 264              | 78.11         |
| RM8A1B4  | 31       | 210        | 111             | 99               | 47.14         |
| RM8A1B5  | 28       | 375        | 131             | 244              | 65.07         |
| RM8A2B5  | 21       | 210        | 47              | 163              | 77.62         |
| RM8A3B2  | 22       | 180        | 0               | 180              | 100.00        |
| RM8A3B4  | 22       | 180        | 0               | 180              | 100.00        |
| RM8A3B6  | 31       | 180        | 42              | 138              | 76.67         |
| RM8A4B1  | 25       | 180        | 43              | 137              | 76.11         |
| RM8A4B3  | 16       | 180        | 54              | 126              | 70.00         |
| RM8A4B5  | 24       | 180        | 29              | 151              | 83.89         |
| RM8A4B6  | 11       | 224        | 0               | 224              | 100.00        |
| RM8A5B2  | 22       | 160        | 24              | 136              | 85.00         |
| RM8A5B4  | 26       | 220        | 66              | 154              | 70.00         |
| RM8A5B6  | 19       | 220        | 45              | 175              | 79.55         |
| RM8A6B1  | 24       | 160        | 72              | 88               | 55.00         |
| RM8A6B2  | 32       | 312        | 6               | 306              | 98.08         |
| RM8A6B3  | 32       | 220        | 72              | 148              | 67.27         |
| RM8A6B4  | 29       | 288        | 72              | 216              | 75.00         |
| RM8A6B5  | 19       | 220        | 69              | 151              | 68.64         |
| RM8A6B6  | 19       | 216        | 26              | 190              | 87.96         |
| RM8A7B5  | 5        | 192        | 19              | 173              | 90.10         |
| RM8A8B2  | 11       | 15         | 0               | 15               | 100.00        |
| RM8A8B6  | 25       | 288        | 48              | 240              | 83.33         |
| RM9A1B1  | 42       | 192        | 62              | 130              | 67.71         |
| RM9A1B2  | 6        | 192        | 22              | 170              | 88.54         |
+----------+----------+------------+-----------------+------------------+---------------+
