+----------+----------+------------+-----------------+------------------+---------------+
| BIN      | UNIT QTY | BIN VOLUME | ASSIGNED VOLUME | AVAILABLE VOLUME | PERCENT AVAIL |
+----------+----------+------------+-----------------+------------------+---------------+
| LOADDOCK | 96673    | 4200       | 318             | 3882             | 92.43         |
| RDA2B20  | 19       | 210        | 84              | 126              | 60.00         |
| RDUA1B10 | 16       | 269        | 18              | 251              | 93.31         |
| RDUA1B11 | 15       | 280        | 52              | 228              | 81.43         |
| RDUA1B13 | 10       | 280        | 9               | 271              | 96.79         |
| RDUA1B15 | 3        | 280        | 13              | 267              | 95.36         |
| RDUA1B25 | 1        | 280        | 4               | 276              | 98.57         |
| RM1A1B1  | 39       | 182        | 45              | 137              | 75.27         |
| RM1A1B10 | 23       | 176        | 47              | 129              | 73.30         |
| RM1A1B11 | 28       | 168        | 0               | 168              | 100.00        |
| RM1A1B12 | 20       | 176        | 32              | 144              | 81.82         |
| RM1A1B13 | 14       | 168        | 68              | 100              | 59.52         |
| RM1A1B14 | 17       | 176        | 42              | 134              | 76.14         |
| RM1A1B15 | 10       | 168        | 35              | 133              | 79.17         |
| RM1A1B16 | 20       | 176        | 3               | 173              | 98.30         |
| RM1A1B17 | 28       | 199        | 40              | 159              | 79.90         |
| RM1A1B18 | 20       | 105        | 66              | 39               | 37.14         |
| RM1A1B19 | 14       | 105        | 58              | 47               | 44.76         |
| RM1A1B2  | 9        | 105        | 48              | 57               | 54.29         |
| RM1A1B21 | 26       | 240        | 40              | 200              | 83.33         |
| RM1A1B23 | 25       | 240        | 37              | 203              | 84.58         |
| RM1A1B3  | 32       | 159        | 82              | 77               | 48.43         |
| RM1A1B4  | 11       | 122        | 0               | 122              | 100.00        |
| RM1A1B5  | 47       | 363        | 85              | 278              | 76.58         |
| RM1A1B6  | 15       | 100        | 0               | 100              | 100.00        |
| RM1A1B7  | 16       | 105        | 33              | 72               | 68.57         |
| RM1A1B8  | 25       | 176        | 28              | 148              | 84.09         |
| RM1A1B9  | 16       | 189        | 0               | 189              | 100.00        |
| RM1A2B1  | 18       | 100        | 38              | 62               | 62.00         |
| RM1A2B10 | 20       | 160        | 42              | 118              | 73.75         |
| RM1A2B11 | 24       | 176        | 47              | 129              | 73.30         |
| RM1A2B12 | 15       | 160        | 32              | 128              | 80.00         |
| RM1A2B2  | 13       | 200        | 0               | 200              | 100.00        |
| RM1A2B3  | 25       | 176        | 72              | 104              | 59.09         |
| RM1A2B4  | 21       | 160        | 29              | 131              | 81.88         |
| RM1A2B5  | 21       | 176        | 28              | 148              | 84.09         |
| RM1A2B6  | 21       | 160        | 95              | 65               | 40.63         |
| RM1A2B7  | 18       | 176        | 61              | 115              | 65.34         |
| RM1A2B8  | 23       | 160        | 95              | 65               | 40.63         |
| RM1A2B9  | 28       | 176        | 26              | 150              | 85.23         |
| RM1A3B1  | 30       | 160        | 96              | 64               | 40.00         |
| RM1A3B10 | 44       | 220        | 132             | 88               | 40.00         |
| RM1A3B11 | 16       | 160        | 0               | 160              | 100.00        |
| RM1A3B2  | 26       | 220        | 51              | 169              | 76.82         |
| RM1A3B3  | 27       | 160        | 40              | 120              | 75.00         |
| RM1A3B4  | 35       | 220        | 75              | 145              | 65.91         |
| RM1A3B5  | 23       | 160        | 113             | 47               | 29.38         |
| RM1A3B6  | 31       | 160        | 29              | 131              | 81.88         |
| RM1A3B7  | 19       | 160        | 0               | 160              | 100.00        |
| RM1A3B8  | 40       | 220        | 104             | 116              | 52.73         |
| RM1A3B9  | 23       | 160        | 60              | 100              | 62.50         |
| RM1A4B1  | 19       | 220        | 30              | 190              | 86.36         |
| RM1A4B10 | 18       | 180        | 51              | 129              | 71.67         |
| RM1A4B12 | 17       | 180        | 9               | 171              | 95.00         |
| RM1A4B14 | 20       | 180        | 49              | 131              | 72.78         |
| RM1A4B2  | 14       | 101        | 18              | 83               | 82.18         |
| RM1A4B3  | 20       | 220        | 40              | 180              | 81.82         |
| RM1A4B4  | 24       | 180        | 14              | 166              | 92.22         |
| RM1A4B5  | 16       | 160        | 63              | 97               | 60.62         |
| RM1A4B6  | 12       | 180        | 17              | 163              | 90.56         |
| RM1A4B7  | 22       | 220        | 53              | 167              | 75.91         |
| RM1A4B8  | 14       | 180        | 30              | 150              | 83.33         |
| RM1A4B9  | 15       | 220        | 0               | 220              | 100.00        |
| RM1A5B1  | 6        | 105        | 0               | 105              | 100.00        |
| RM1A5B10 | 14       | 168        | 0               | 168              | 100.00        |
| RM1A5B11 | 30       | 180        | 13              | 167              | 92.78         |
| RM1A5B12 | 4        | 168        | 0               | 168              | 100.00        |
| RM1A5B13 | 22       | 180        | 38              | 142              | 78.89         |
| RM1A5B14 | 34       | 168        | 0               | 168              | 100.00        |
| RM1A5B15 | 15       | 180        | 22              | 158              | 87.78         |
| RM1A5B16 | 23       | 199        | 86              | 113              | 56.78         |
| RM1A5B18 | 25       | 230        | 64              | 166              | 72.17         |
| RM1A5B2  | 17       | 210        | 25              | 185              | 88.10         |
| RM1A5B22 | 29       | 126        | 71              | 55               | 43.65         |
| RM1A5B24 | 25       | 168        | 0               | 168              | 100.00        |
| RM1A5B4  | 23       | 168        | 0               | 168              | 100.00        |
| RM1A5B5  | 26       | 180        | 73              | 107              | 59.44         |
| RM1A5B6  | 26       | 168        | 35              | 133              | 79.17         |
| RM1A5B7  | 18       | 180        | 22              | 158              | 87.78         |
| RM1A5B8  | 20       | 185        | 0               | 185              | 100.00        |
| RM1A5B9  | 19       | 180        | 79              | 101              | 56.11         |
| RM2A1B1  | 20       | 140        | 45              | 95               | 67.86         |
| RM2A1B10 | 10       | 100        | 29              | 71               | 71.00         |
| RM2A1B11 | 16       | 168        | 0               | 168              | 100.00        |
| RM2A1B13 | 26       | 252        | 131             | 121              | 48.02         |
| RM2A1B2  | 12       | 100        | 28              | 72               | 72.00         |
| RM2A1B3  | 12       | 157        | 0               | 157              | 100.00        |
| RM2A1B4  | 12       | 100        | 25              | 75               | 75.00         |
| RM2A1B5  | 30       | 230        | 68              | 162              | 70.43         |
| RM2A1B6  | 7        | 100        | 12              | 88               | 88.00         |
| RM2A1B7  | 41       | 210        | 64              | 146              | 69.52         |
| RM2A1B8  | 22       | 100        | 39              | 61               | 61.00         |
| RM2A2B1  | 10       | 100        | 28              | 72               | 72.00         |
| RM2A2B2  | 16       | 100        | 25              | 75               | 75.00         |
| RM2A2B3  | 16       | 100        | 61              | 39               | 39.00         |
| RM2A2B4  | 13       | 100        | 39              | 61               | 61.00         |
| RM2A2B5  | 13       | 100        | 32              | 68               | 68.00         |
| RM2A2B6  | 14       | 100        | 4               | 96               | 96.00         |
| RM2A2B7  | 15       | 100        | 62              | 38               | 38.00         |
| RM2A2B8  | 16       | 100        | 13              | 87               | 87.00         |
| RM2A2B9  | 14       | 100        | 41              | 59               | 59.00         |
| RM2A3B1  | 14       | 100        | 35              | 65               | 65.00         |
| RM2A3B10 | 18       | 100        | 25              | 75               | 75.00         |
| RM2A3B12 | 16       | 100        | 25              | 75               | 75.00         |
| RM2A3B14 | 16       | 100        | 0               | 100              | 100.00        |
| RM2A3B16 | 12       | 100        | 23              | 77               | 77.00         |
| RM2A3B18 | 19       | 100        | 21              | 79               | 79.00         |
| RM2A3B2  | 23       | 100        | 42              | 58               | 58.00         |
| Rm2A3B3  | 22       | 100        | 79              | 21               | 21.00         |
| RM2A3B4  | 13       | 100        | 27              | 73               | 73.00         |
| RM2A3B5  | 18       | 100        | 38              | 62               | 62.00         |
| RM2A3B6  | 17       | 100        | 44              | 56               | 56.00         |
| RM2A3B7  | 18       | 100        | 52              | 48               | 48.00         |
| RM2A3B8  | 11       | 100        | 0               | 100              | 100.00        |
| RM2A4B1  | 15       | 100        | 21              | 79               | 79.00         |
| RM2A4B10 | 33       | 240        | 103             | 137              | 57.08         |
| RM2A4B11 | 13       | 100        | 18              | 82               | 82.00         |
| RM2A4B12 | 18       | 192        | 48              | 144              | 75.00         |
| RM2A4B13 | 13       | 100        | 58              | 42               | 42.00         |
| RM2A4B14 | 19       | 192        | 58              | 134              | 69.79         |
| RM2A4B15 | 14       | 100        | 21              | 79               | 79.00         |
| RM2A4B17 | 13       | 100        | 0               | 100              | 100.00        |
| RM2A4B2  | 19       | 240        | 0               | 240              | 100.00        |
| RM2A4B3  | 11       | 100        | 7               | 93               | 93.00         |
| RM2A4B4  | 27       | 168        | 72              | 96               | 57.14         |
| RM2A4B5  | 21       | 100        | 23              | 77               | 77.00         |
| RM2A4B7  | 14       | 100        | 31              | 69               | 69.00         |
| RM2A4B8  | 36       | 192        | 69              | 123              | 64.06         |
| RM2A4B9  | 9        | 100        | 23              | 77               | 77.00         |
| RM2A5B1  | 57       | 504        | 138             | 366              | 72.62         |
| RM2A5B2  | 20       | 576        | 73              | 503              | 87.33         |
| RM3A1B1  | 26       | 380        | 61              | 319              | 83.95         |
| RM3A1B2  | 44       | 330        | 67              | 263              | 79.70         |
| RM3A1B3  | 26       | 320        | 11              | 309              | 96.56         |
| RM3A1B5  | 24       | 240        | 59              | 181              | 75.42         |
| RM3A1B7  | 32       | 220        | 42              | 178              | 80.91         |
| RM3A1B9  | 15       | 160        | 44              | 116              | 72.50         |
| RM3A2B1  | 14       | 120        | 44              | 76               | 63.33         |
| RM3A2B2  | 26       | 320        | 68              | 252              | 78.75         |
| RM3A2B3  | 16       | 120        | 13              | 107              | 89.17         |
| RM3A2B4  | 24       | 240        | 68              | 172              | 71.67         |
| RM3A2B5  | 16       | 170        | 11              | 159              | 93.53         |
| RM3A2B6  | 19       | 220        | 47              | 173              | 78.64         |
| RM3A2B7  | 19       | 210        | 37              | 173              | 82.38         |
| RM3A2B9  | 29       | 160        | 35              | 125              | 78.13         |
| RM3A3B1  | 8        | 120        | 0               | 120              | 100.00        |
| RM3A3B10 | 15       | 110        | 93              | 17               | 15.45         |
| RM3A3B11 | 17       | 100        | 33              | 67               | 67.00         |
| RM3A3B12 | 28       | 154        | 20              | 134              | 87.01         |
| RM3A3B13 | 16       | 100        | 0               | 100              | 100.00        |
| RM3A3B14 | 22       | 176        | 40              | 136              | 77.27         |
| RM3A3B15 | 17       | 100        | 38              | 62               | 62.00         |
| RM3A3B17 | 16       | 100        | 15              | 85               | 85.00         |
| RM3A3B18 | 13       | 125        | 11              | 114              | 91.20         |
| RM3A3B19 | 15       | 100        | 4               | 96               | 96.00         |
| RM3A3B21 | 17       | 100        | 63              | 37               | 37.00         |
| RM3A3B22 | 17       | 120        | 3               | 117              | 97.50         |
| RM3A3B23 | 19       | 240        | 0               | 240              | 100.00        |
| RM3A3B24 | 26       | 215        | 85              | 130              | 60.47         |
| RM3A3B25 | 19       | 216        | 3               | 213              | 98.61         |
| RM3A3B26 | 23       | 180        | 34              | 146              | 81.11         |
| RM3A3B27 | 25       | 160        | 130             | 30               | 18.75         |
| RM3A3B3  | 21       | 128        | 89              | 39               | 30.47         |
| RM3A3B5  | 18       | 125        | 19              | 106              | 84.80         |
| RM3A3B6  | 25       | 231        | 31              | 200              | 86.58         |
| RM3A3B7  | 11       | 100        | 35              | 65               | 65.00         |
| RM3A3B8  | 27       | 264        | 47              | 217              | 82.20         |
| RM3A3B9  | 9        | 100        | 20              | 80               | 80.00         |
| RM3A4B1  | 13       | 144        | 13              | 131              | 90.97         |
| RM3A4B10 | 13       | 100        | 24              | 76               | 76.00         |
| RM3A4B11 | 19       | 144        | 3               | 141              | 97.92         |
| RM3A4B12 | 13       | 100        | 28              | 72               | 72.00         |
| RM3A4B14 | 17       | 100        | 30              | 70               | 70.00         |
| RM3A4B16 | 14       | 100        | 35              | 65               | 65.00         |
| RM3A4B18 | 16       | 100        | 31              | 69               | 69.00         |
| RM3A4B2  | 15       | 128        | 38              | 90               | 70.31         |
| RM3A4B20 | 17       | 100        | 20              | 80               | 80.00         |
| RM3A4B22 | 20       | 100        | 104             | -4               | -4.00         |
| RM3A4B23 | 21       | 144        | 59              | 85               | 59.03         |
| RM3A4B24 | 25       | 198        | 53              | 145              | 73.23         |
| RM3A4B25 | 28       | 144        | 10              | 134              | 93.06         |
| RM3A4B26 | 25       | 198        | 74              | 124              | 62.63         |
| RM3A4B28 | 16       | 160        | 4               | 156              | 97.50         |
| RM3A4B29 | 17       | 144        | 0               | 144              | 100.00        |
| RM3A4B3  | 32       | 144        | 30              | 114              | 79.17         |
| RM3A4B31 | 20       | 144        | 27              | 117              | 81.25         |
| RM3A4B4  | 23       | 128        | 73              | 55               | 42.97         |
| RM3A4B5  | 27       | 144        | 85              | 59               | 40.97         |
| RM3A4B6  | 22       | 125        | 22              | 103              | 82.40         |
| RM3A4B7  | 27       | 144        | 56              | 88               | 61.11         |
| RM3A4B8  | 16       | 100        | 22              | 78               | 78.00         |
| RM3A4B9  | 15       | 144        | 22              | 122              | 84.72         |
| RM3A5B10 | 15       | 144        | 0               | 144              | 100.00        |
| RM3A5B11 | 28       | 144        | 65              | 79               | 54.86         |
| RM3A5B12 | 24       | 144        | 70              | 74               | 51.39         |
| RM3A5B13 | 17       | 144        | 0               | 144              | 100.00        |
| RM3A5B14 | 12       | 144        | 39              | 105              | 72.92         |
| RM3A5B15 | 7        | 90         | 16              | 74               | 82.22         |
| RM3A5B16 | 21       | 144        | 86              | 58               | 40.28         |
| RM3A5B17 | 25       | 162        | 87              | 75               | 46.30         |
| RM3A5B18 | 20       | 144        | 69              | 75               | 52.08         |
| RM3A5B19 | 25       | 162        | 79              | 83               | 51.23         |
| RM3A5B2  | 16       | 144        | 30              | 114              | 79.17         |
| RM3A5B20 | 24       | 144        | 53              | 91               | 63.19         |
| RM3A5B21 | 26       | 162        | 47              | 115              | 70.99         |
| RM3A5B3  | 27       | 240        | 22              | 218              | 90.83         |
| RM3A5B4  | 14       | 144        | 76              | 68               | 47.22         |
| RM3A5B5  | 27       | 200        | 93              | 107              | 53.50         |
| RM3A5B6  | 8        | 144        | 5               | 139              | 96.53         |
| RM3A5B7  | 14       | 200        | 15              | 185              | 92.50         |
| RM3A5B8  | 13       | 144        | 22              | 122              | 84.72         |
| RM3A5B9  | 23       | 200        | 30              | 170              | 85.00         |
| RM3A6B1  | 24       | 288        | 0               | 288              | 100.00        |
| RM3A6B10 | 20       | 200        | 78              | 122              | 61.00         |
| RM3A6B11 | 6        | 105        | 34              | 71               | 67.62         |
| RM3A6B13 | 34       | 240        | 31              | 209              | 87.08         |
| RM3A6B14 | 30       | 225        | 124             | 101              | 44.89         |
| RM3A6B15 | 38       | 220        | 55              | 165              | 75.00         |
| RM3A6B17 | 53       | 561        | 230             | 331              | 59.00         |
| RM3A6B18 | 24       | 225        | 97              | 128              | 56.89         |
| RM3A6B2  | 22       | 200        | 35              | 165              | 82.50         |
| RM3A6B4  | 13       | 200        | 6               | 194              | 97.00         |
| RM3A6B5  | 55       | 288        | 0               | 288              | 100.00        |
| RM3A6B6  | 12       | 200        | 0               | 200              | 100.00        |
| RM3A6B7  | 21       | 200        | 12              | 188              | 94.00         |
| RM3A6B8  | 14       | 200        | 61              | 139              | 69.50         |
| RM3A6B9  | 34       | 275        | 101             | 174              | 63.27         |
| RM3A7B2  | 8        | 200        | 0               | 200              | 100.00        |
| RM3A7B3  | 27       | 360        | 0               | 360              | 100.00        |
| RM3A7B4  | 22       | 275        | 0               | 275              | 100.00        |
| RM3A7B5  | 28       | 560        | 0               | 560              | 100.00        |
| RM3A7B7  | 16       | 100        | 29              | 71               | 71.00         |
| RM3A7B8  | 13       | 240        | 35              | 205              | 85.42         |
| RM4A1B1  | 34       | 240        | 0               | 240              | 100.00        |
| RM4A1B3  | 62       | 432        | 24              | 408              | 94.44         |
| RM4A1B5  | 53       | 312        | 170             | 142              | 45.51         |
| RM4A2B10 | 8        | 100        | 0               | 100              | 100.00        |
| RM4A2B12 | 14       | 100        | 37              | 63               | 63.00         |
| RM4A2B8  | 20       | 100        | 35              | 65               | 65.00         |
| RM4A3B10 | 10       | 100        | 40              | 60               | 60.00         |
| RM4A3B11 | 14       | 100        | 33              | 67               | 67.00         |
| RM4A3B12 | 13       | 100        | 68              | 32               | 32.00         |
| RM4A3B13 | 11       | 100        | 27              | 73               | 73.00         |
| RM4A3B2  | 31       | 200        | 126             | 74               | 37.00         |
| RM4A3B4  | 25       | 190        | 71              | 119              | 62.63         |
| RM4A3B6  | 28       | 440        | 32              | 408              | 92.73         |
| RM4A3B7  | 20       | 100        | 29              | 71               | 71.00         |
| RM4A3B8  | 51       | 440        | 173             | 267              | 60.68         |
| RM4A3B9  | 14       | 100        | 38              | 62               | 62.00         |
| RM4A4B1  | 9        | 100        | 22              | 78               | 78.00         |
| RM4A4B10 | 28       | 260        | 55              | 205              | 78.85         |
| RM4A4B2  | 30       | 216        | 43              | 173              | 80.09         |
| RM4A4B3  | 15       | 100        | 33              | 67               | 67.00         |
| RM4A4B4  | 19       | 216        | 21              | 195              | 90.28         |
| RM4A4B5  | 15       | 100        | 52              | 48               | 48.00         |
| RM4A4B8  | 10       | 190        | 0               | 190              | 100.00        |
| RM6-2    | 114      | 1440       | 202             | 1238             | 85.97         |
| RM6-3    | 56       | 576        | 49              | 527              | 91.49         |
| RM6A1B1  | 13       | 216        | 20              | 196              | 90.74         |
| RM6A1B10 | 11       | 100        | 36              | 64               | 64.00         |
| RM6A1B11 | 18       | 168        | 99              | 69               | 41.07         |
| RM6A1B12 | 12       | 100        | 12              | 88               | 88.00         |
| RM6A1B14 | 14       | 100        | 41              | 59               | 59.00         |
| RM6A1B16 | 16       | 100        | 42              | 58               | 58.00         |
| RM6A1B2  | 11       | 144        | 0               | 144              | 100.00        |
| RM6A1B3  | 23       | 192        | 89              | 103              | 53.65         |
| RM6A1B4  | 12       | 100        | 53              | 47               | 47.00         |
| RM6A1B5  | 16       | 192        | 0               | 192              | 100.00        |
| RM6A1B6  | 16       | 100        | 32              | 68               | 68.00         |
| RM6A1B7  | 18       | 192        | 26              | 166              | 86.46         |
| RM6A1B8  | 15       | 100        | 13              | 87               | 87.00         |
| RM6A2B1  | 12       | 144        | 32              | 112              | 77.78         |
| RM6A2B11 | 11       | 100        | 37              | 63               | 63.00         |
| RM6A2B13 | 16       | 100        | 29              | 71               | 71.00         |
| RM6A2B15 | 17       | 100        | 59              | 41               | 41.00         |
| RM6A2B2  | 16       | 240        | 37              | 203              | 84.58         |
| RM6A2B3  | 14       | 100        | 0               | 100              | 100.00        |
| RM6A2B4  | 18       | 216        | 51              | 165              | 76.39         |
| RM6A2B5  | 14       | 100        | 24              | 76               | 76.00         |
| RM6A2B6  | 13       | 192        | 45              | 147              | 76.56         |
| RM6A2B7  | 14       | 100        | 66              | 34               | 34.00         |
| RM6A2B8  | 12       | 192        | 34              | 158              | 82.29         |
| RM6A2B9  | 13       | 100        | 0               | 100              | 100.00        |
| RM6A3B1  | 17       | 240        | 40              | 200              | 83.33         |
| RM6A3B10 | 39       | 384        | 146             | 238              | 61.98         |
| RM6A3B2  | 24       | 240        | 0               | 240              | 100.00        |
| RM6A3B3  | 18       | 216        | 62              | 154              | 71.30         |
| RM6A3B4  | 24       | 320        | 34              | 286              | 89.38         |
| RM6A3B6  | 29       | 384        | 30              | 354              | 92.19         |
| RM6A3B8  | 67       | 384        | 214             | 170              | 44.27         |
| RM7A1B1  | 28       | 270        | 77              | 193              | 71.48         |
| RM7A1B11 | 65       | 100        | 27              | 73               | 73.00         |
| RM7A1B3  | 24       | 270        | 57              | 213              | 78.89         |
| RM7A1B5  | 16       | 100        | 0               | 100              | 100.00        |
| RM7A1B7  | 16       | 100        | 38              | 62               | 62.00         |
| RM7A1B9  | 14       | 100        | 38              | 62               | 62.00         |
| RM7A2B10 | 12       | 100        | 12              | 88               | 88.00         |
| RM7A2B12 | 7        | 100        | 38              | 62               | 62.00         |
| RM7A2B2  | 32       | 270        | 15              | 255              | 94.44         |
| RM7A2B4  | 38       | 270        | 75              | 195              | 72.22         |
| RM7A2B6  | 15       | 100        | 45              | 55               | 55.00         |
| RM7A2B7  | 27       | 270        | 18              | 252              | 93.33         |
| RM7A2B8  | 3        | 100        | 19              | 81               | 81.00         |
| RM7A2B9  | 33       | 270        | 70              | 200              | 74.07         |
| RM7A3B1  | 13       | 288        | 28              | 260              | 90.28         |
| RM7A3B2  | 10       | 448        | 15              | 433              | 96.65         |
| RM7A3B3  | 10       | 256        | 25              | 231              | 90.23         |
| RM7A3B5  | 28       | 352        | 0               | 352              | 100.00        |
| RM7A3B6  | 23       | 270        | 45              | 225              | 83.33         |
| RM7A3B7  | 48       | 240        | 169             | 71               | 29.58         |
| RM7A3B8  | 26       | 410        | 34              | 376              | 91.71         |
| RM7A3B9  | 10       | 128        | 0               | 128              | 100.00        |
| RM8A1B1  | 26       | 338        | 79              | 259              | 76.63         |
| RM8A1B3  | 44       | 338        | 132             | 206              | 60.95         |
| RM8A1B4  | 30       | 210        | 6               | 204              | 97.14         |
| RM8A1B5  | 30       | 375        | 86              | 289              | 77.07         |
| RM8A2B5  | 14       | 210        | 26              | 184              | 87.62         |
| RM8A3B2  | 21       | 180        | 0               | 180              | 100.00        |
| RM8A3B4  | 22       | 180        | 17              | 163              | 90.56         |
| RM8A3B6  | 28       | 180        | 31              | 149              | 82.78         |
| RM8A4B1  | 21       | 180        | 35              | 145              | 80.56         |
| RM8A4B3  | 22       | 180        | 14              | 166              | 92.22         |
| RM8A4B4  | 11       | 128        | 33              | 95               | 74.22         |
| RM8A4B5  | 38       | 180        | 79              | 101              | 56.11         |
| RM8A4B6  | 21       | 224        | 87              | 137              | 61.16         |
| RM8A5B2  | 28       | 160        | 54              | 106              | 66.25         |
| RM8A5B4  | 43       | 220        | 134             | 86               | 39.09         |
| RM8A5B6  | 29       | 220        | 43              | 177              | 80.45         |
| RM8A6B1  | 29       | 160        | 24              | 136              | 85.00         |
| RM8A6B2  | 38       | 312        | 32              | 280              | 89.74         |
| RM8A6B3  | 32       | 220        | 105             | 115              | 52.27         |
| RM8A6B4  | 30       | 288        | 76              | 212              | 73.61         |
| RM8A6B5  | 17       | 220        | 63              | 157              | 71.36         |
| RM8A6B6  | 19       | 216        | 43              | 173              | 80.09         |
| RM8A7B5  | 12       | 192        | 36              | 156              | 81.25         |
| RM8A8B2  | 11       | 15         | 0               | 15               | 100.00        |
| RM8A8B6  | 20       | 288        | 70              | 218              | 75.69         |
| RM9A1B1  | 35       | 192        | 63              | 129              | 67.19         |
| RM9A1B2  | 5        | 192        | 17              | 175              | 91.15         |
+----------+----------+------------+-----------------+------------------+---------------+
