+----------+----------+------------+-----------------+------------------+---------------+
| BIN      | UNIT QTY | BIN VOLUME | ASSIGNED VOLUME | AVAILABLE VOLUME | PERCENT AVAIL |
+----------+----------+------------+-----------------+------------------+---------------+
| LOADDOCK | 96092    | 4200       | 245             | 3955             | 94.17         |
| RDA2B20  | 22       | 210        | 87              | 123              | 58.57         |
| RDUA1B10 | 4        | 269        | 13              | 256              | 95.17         |
| RDUA1B11 | 10       | 280        | 32              | 248              | 88.57         |
| RDUA1B13 | 6        | 280        | 3               | 277              | 98.93         |
| RDUA1B15 | 3        | 280        | 18              | 262              | 93.57         |
| RM1A1B1  | 22       | 182        | 45              | 137              | 75.27         |
| RM1A1B10 | 16       | 176        | 13              | 163              | 92.61         |
| RM1A1B11 | 21       | 168        | 0               | 168              | 100.00        |
| RM1A1B12 | 23       | 176        | 58              | 118              | 67.05         |
| RM1A1B13 | 28       | 168        | 0               | 168              | 100.00        |
| RM1A1B14 | 30       | 176        | 55              | 121              | 68.75         |
| RM1A1B15 | 34       | 168        | 147             | 21               | 12.50         |
| RM1A1B16 | 26       | 176        | 58              | 118              | 67.05         |
| RM1A1B17 | 18       | 199        | 0               | 199              | 100.00        |
| RM1A1B18 | 12       | 105        | 40              | 65               | 61.90         |
| RM1A1B19 | 14       | 105        | 34              | 71               | 67.62         |
| RM1A1B2  | 9        | 105        | 48              | 57               | 54.29         |
| RM1A1B21 | 20       | 240        | 0               | 240              | 100.00        |
| RM1A1B23 | 24       | 240        | 48              | 192              | 80.00         |
| RM1A1B3  | 38       | 159        | 78              | 81               | 50.94         |
| RM1A1B4  | 11       | 122        | 0               | 122              | 100.00        |
| RM1A1B5  | 24       | 363        | 103             | 260              | 71.63         |
| RM1A1B6  | 16       | 100        | 0               | 100              | 100.00        |
| RM1A1B7  | 13       | 105        | 30              | 75               | 71.43         |
| RM1A1B8  | 24       | 176        | 28              | 148              | 84.09         |
| RM1A1B9  | 14       | 189        | 0               | 189              | 100.00        |
| RM1A2B1  | 14       | 100        | 27              | 73               | 73.00         |
| RM1A2B10 | 18       | 160        | 83              | 77               | 48.13         |
| RM1A2B11 | 19       | 176        | 55              | 121              | 68.75         |
| RM1A2B12 | 16       | 160        | 35              | 125              | 78.13         |
| RM1A2B2  | 13       | 200        | 0               | 200              | 100.00        |
| RM1A2B3  | 20       | 176        | 81              | 95               | 53.98         |
| RM1A2B4  | 20       | 160        | 34              | 126              | 78.75         |
| RM1A2B5  | 20       | 176        | 72              | 104              | 59.09         |
| RM1A2B6  | 17       | 160        | 95              | 65               | 40.63         |
| RM1A2B7  | 24       | 176        | 59              | 117              | 66.48         |
| RM1A2B8  | 32       | 160        | 24              | 136              | 85.00         |
| RM1A2B9  | 17       | 176        | 85              | 91               | 51.70         |
| RM1A3B1  | 25       | 160        | 28              | 132              | 82.50         |
| RM1A3B10 | 45       | 220        | 100             | 120              | 54.55         |
| RM1A3B11 | 21       | 160        | 21              | 139              | 86.88         |
| RM1A3B2  | 36       | 220        | 10              | 210              | 95.45         |
| RM1A3B3  | 22       | 160        | 37              | 123              | 76.88         |
| RM1A3B4  | 32       | 220        | 85              | 135              | 61.36         |
| RM1A3B5  | 15       | 160        | 80              | 80               | 50.00         |
| RM1A3B6  | 30       | 160        | 36              | 124              | 77.50         |
| RM1A3B7  | 16       | 160        | 18              | 142              | 88.75         |
| RM1A3B8  | 37       | 220        | 97              | 123              | 55.91         |
| RM1A3B9  | 21       | 160        | 4               | 156              | 97.50         |
| RM1A4B1  | 26       | 220        | 77              | 143              | 65.00         |
| RM1A4B10 | 29       | 180        | 87              | 93               | 51.67         |
| RM1A4B12 | 22       | 180        | 5               | 175              | 97.22         |
| RM1A4B14 | 16       | 180        | 49              | 131              | 72.78         |
| RM1A4B2  | 13       | 101        | 4               | 97               | 96.04         |
| RM1A4B3  | 37       | 220        | 101             | 119              | 54.09         |
| RM1A4B4  | 23       | 180        | 10              | 170              | 94.44         |
| RM1A4B5  | 21       | 160        | 90              | 70               | 43.75         |
| RM1A4B6  | 20       | 180        | 16              | 164              | 91.11         |
| RM1A4B7  | 21       | 220        | 32              | 188              | 85.45         |
| RM1A4B8  | 21       | 180        | 48              | 132              | 73.33         |
| RM1A4B9  | 11       | 220        | 0               | 220              | 100.00        |
| RM1A5B1  | 5        | 105        | 0               | 105              | 100.00        |
| RM1A5B10 | 12       | 168        | 0               | 168              | 100.00        |
| RM1A5B11 | 18       | 180        | 41              | 139              | 77.22         |
| RM1A5B12 | 17       | 168        | 0               | 168              | 100.00        |
| RM1A5B13 | 15       | 180        | 34              | 146              | 81.11         |
| RM1A5B14 | 13       | 168        | 0               | 168              | 100.00        |
| RM1A5B15 | 12       | 180        | 42              | 138              | 76.67         |
| RM1A5B16 | 39       | 199        | 142             | 57               | 28.64         |
| RM1A5B18 | 27       | 230        | 84              | 146              | 63.48         |
| RM1A5B2  | 35       | 210        | 0               | 210              | 100.00        |
| RM1A5B22 | 16       | 126        | 0               | 126              | 100.00        |
| RM1A5B24 | 19       | 168        | 20              | 148              | 88.10         |
| RM1A5B4  | 20       | 168        | 16              | 152              | 90.48         |
| RM1A5B5  | 22       | 180        | 62              | 118              | 65.56         |
| RM1A5B6  | 20       | 168        | 0               | 168              | 100.00        |
| RM1A5B7  | 25       | 180        | 42              | 138              | 76.67         |
| RM1A5B8  | 24       | 185        | 0               | 185              | 100.00        |
| RM1A5B9  | 19       | 180        | 19              | 161              | 89.44         |
| RM2A1B1  | 18       | 140        | 45              | 95               | 67.86         |
| RM2A1B10 | 8        | 100        | 26              | 74               | 74.00         |
| RM2A1B11 | 15       | 168        | 37              | 131              | 77.98         |
| RM2A1B13 | 17       | 252        | 89              | 163              | 64.68         |
| RM2A1B2  | 12       | 100        | 22              | 78               | 78.00         |
| RM2A1B3  | 24       | 157        | 76              | 81               | 51.59         |
| RM2A1B4  | 6        | 100        | 9               | 91               | 91.00         |
| RM2A1B5  | 11       | 230        | 43              | 187              | 81.30         |
| RM2A1B6  | 12       | 100        | 27              | 73               | 73.00         |
| RM2A1B7  | 35       | 210        | 71              | 139              | 66.19         |
| RM2A1B8  | 12       | 100        | 0               | 100              | 100.00        |
| RM2A2B1  | 13       | 100        | 14              | 86               | 86.00         |
| RM2A2B2  | 14       | 100        | 11              | 89               | 89.00         |
| RM2A2B3  | 16       | 100        | 60              | 40               | 40.00         |
| RM2A2B4  | 14       | 100        | 15              | 85               | 85.00         |
| RM2A2B5  | 11       | 100        | 8               | 92               | 92.00         |
| RM2A2B6  | 14       | 100        | 24              | 76               | 76.00         |
| RM2A2B7  | 12       | 100        | 54              | 46               | 46.00         |
| RM2A2B8  | 14       | 100        | 13              | 87               | 87.00         |
| RM2A2B9  | 16       | 100        | 26              | 74               | 74.00         |
| RM2A3B1  | 11       | 100        | 0               | 100              | 100.00        |
| RM2A3B10 | 17       | 100        | 49              | 51               | 51.00         |
| RM2A3B12 | 18       | 100        | 21              | 79               | 79.00         |
| RM2A3B14 | 15       | 100        | 4               | 96               | 96.00         |
| RM2A3B16 | 16       | 100        | 51              | 49               | 49.00         |
| RM2A3B18 | 15       | 100        | 15              | 85               | 85.00         |
| RM2A3B2  | 15       | 100        | 30              | 70               | 70.00         |
| Rm2A3B3  | 21       | 100        | 59              | 41               | 41.00         |
| RM2A3B4  | 17       | 100        | 16              | 84               | 84.00         |
| RM2A3B5  | 14       | 100        | 25              | 75               | 75.00         |
| RM2A3B6  | 17       | 100        | 52              | 48               | 48.00         |
| RM2A3B7  | 13       | 100        | 22              | 78               | 78.00         |
| RM2A3B8  | 15       | 100        | 20              | 80               | 80.00         |
| RM2A4B1  | 11       | 100        | 12              | 88               | 88.00         |
| RM2A4B10 | 20       | 240        | 22              | 218              | 90.83         |
| RM2A4B11 | 6        | 100        | 8               | 92               | 92.00         |
| RM2A4B12 | 17       | 192        | 44              | 148              | 77.08         |
| RM2A4B13 | 13       | 100        | 47              | 53               | 53.00         |
| RM2A4B14 | 14       | 192        | 45              | 147              | 76.56         |
| RM2A4B15 | 15       | 100        | 21              | 79               | 79.00         |
| RM2A4B17 | 11       | 100        | 9               | 91               | 91.00         |
| RM2A4B2  | 18       | 240        | 0               | 240              | 100.00        |
| RM2A4B3  | 4        | 100        | 13              | 87               | 87.00         |
| RM2A4B4  | 32       | 168        | 66              | 102              | 60.71         |
| RM2A4B5  | 13       | 100        | 8               | 92               | 92.00         |
| RM2A4B7  | 13       | 100        | 6               | 94               | 94.00         |
| RM2A4B8  | 25       | 192        | 36              | 156              | 81.25         |
| RM2A4B9  | 9        | 100        | 23              | 77               | 77.00         |
| RM2A5B1  | 46       | 504        | 99              | 405              | 80.36         |
| RM2A5B2  | 39       | 576        | 81              | 495              | 85.94         |
| RM3A1B1  | 36       | 380        | 45              | 335              | 88.16         |
| RM3A1B2  | 46       | 330        | 73              | 257              | 77.88         |
| RM3A1B3  | 34       | 320        | 23              | 297              | 92.81         |
| RM3A1B5  | 24       | 240        | 81              | 159              | 66.25         |
| RM3A1B7  | 28       | 220        | 5               | 215              | 97.73         |
| RM3A1B9  | 14       | 160        | 56              | 104              | 65.00         |
| RM3A2B1  | 14       | 120        | 44              | 76               | 63.33         |
| RM3A2B2  | 24       | 320        | 43              | 277              | 86.56         |
| RM3A2B3  | 10       | 120        | 10              | 110              | 91.67         |
| RM3A2B4  | 29       | 240        | 140             | 100              | 41.67         |
| RM3A2B5  | 19       | 170        | 47              | 123              | 72.35         |
| RM3A2B6  | 20       | 220        | 39              | 181              | 82.27         |
| RM3A2B7  | 31       | 210        | 46              | 164              | 78.10         |
| RM3A2B9  | 21       | 160        | 35              | 125              | 78.13         |
| RM3A3B1  | 21       | 120        | 37              | 83               | 69.17         |
| RM3A3B10 | 13       | 110        | 23              | 87               | 79.09         |
| RM3A3B11 | 13       | 100        | 19              | 81               | 81.00         |
| RM3A3B12 | 31       | 154        | 7               | 147              | 95.45         |
| RM3A3B13 | 17       | 100        | 0               | 100              | 100.00        |
| RM3A3B14 | 20       | 176        | 64              | 112              | 63.64         |
| RM3A3B15 | 19       | 100        | 38              | 62               | 62.00         |
| RM3A3B17 | 17       | 100        | 15              | 85               | 85.00         |
| RM3A3B18 | 17       | 125        | 11              | 114              | 91.20         |
| RM3A3B19 | 16       | 100        | 19              | 81               | 81.00         |
| RM3A3B21 | 16       | 100        | 55              | 45               | 45.00         |
| RM3A3B22 | 16       | 120        | 0               | 120              | 100.00        |
| RM3A3B23 | 18       | 240        | 22              | 218              | 90.83         |
| RM3A3B24 | 31       | 215        | 59              | 156              | 72.56         |
| RM3A3B25 | 27       | 216        | 45              | 171              | 79.17         |
| RM3A3B26 | 15       | 180        | 17              | 163              | 90.56         |
| RM3A3B27 | 28       | 160        | 127             | 33               | 20.63         |
| RM3A3B3  | 20       | 128        | 39              | 89               | 69.53         |
| RM3A3B5  | 15       | 125        | 35              | 90               | 72.00         |
| RM3A3B6  | 12       | 231        | 20              | 211              | 91.34         |
| RM3A3B7  | 13       | 100        | 45              | 55               | 55.00         |
| RM3A3B8  | 22       | 264        | 59              | 205              | 77.65         |
| RM3A3B9  | 13       | 100        | 14              | 86               | 86.00         |
| RM3A4B1  | 18       | 144        | 24              | 120              | 83.33         |
| RM3A4B10 | 14       | 100        | 32              | 68               | 68.00         |
| RM3A4B11 | 23       | 144        | 37              | 107              | 74.31         |
| RM3A4B12 | 15       | 100        | 63              | 37               | 37.00         |
| RM3A4B14 | 19       | 100        | 23              | 77               | 77.00         |
| RM3A4B16 | 13       | 100        | 41              | 59               | 59.00         |
| RM3A4B18 | 13       | 100        | 14              | 86               | 86.00         |
| RM3A4B2  | 15       | 128        | 38              | 90               | 70.31         |
| RM3A4B20 | 15       | 100        | 36              | 64               | 64.00         |
| RM3A4B22 | 7        | 100        | 30              | 70               | 70.00         |
| RM3A4B23 | 22       | 144        | 59              | 85               | 59.03         |
| RM3A4B24 | 24       | 198        | 89              | 109              | 55.05         |
| RM3A4B25 | 20       | 144        | 10              | 134              | 93.06         |
| RM3A4B26 | 24       | 198        | 57              | 141              | 71.21         |
| RM3A4B28 | 11       | 160        | 0               | 160              | 100.00        |
| RM3A4B29 | 16       | 144        | 0               | 144              | 100.00        |
| RM3A4B3  | 22       | 144        | 25              | 119              | 82.64         |
| RM3A4B31 | 14       | 144        | 39              | 105              | 72.92         |
| RM3A4B4  | 13       | 128        | 34              | 94               | 73.44         |
| RM3A4B5  | 24       | 144        | 126             | 18               | 12.50         |
| RM3A4B6  | 8        | 125        | 4               | 121              | 96.80         |
| RM3A4B7  | 21       | 144        | 32              | 112              | 77.78         |
| RM3A4B8  | 12       | 100        | 0               | 100              | 100.00        |
| RM3A4B9  | 27       | 144        | 54              | 90               | 62.50         |
| RM3A5B1  | 2        | 312        | 0               | 312              | 100.00        |
| RM3A5B10 | 12       | 144        | 11              | 133              | 92.36         |
| RM3A5B11 | 19       | 144        | 17              | 127              | 88.19         |
| RM3A5B12 | 18       | 144        | 84              | 60               | 41.67         |
| RM3A5B13 | 23       | 144        | 27              | 117              | 81.25         |
| RM3A5B14 | 11       | 144        | 0               | 144              | 100.00        |
| RM3A5B15 | 4        | 90         | 0               | 90               | 100.00        |
| RM3A5B16 | 24       | 144        | 56              | 88               | 61.11         |
| RM3A5B17 | 20       | 162        | 65              | 97               | 59.88         |
| RM3A5B18 | 21       | 144        | 38              | 106              | 73.61         |
| RM3A5B19 | 32       | 162        | 0               | 162              | 100.00        |
| RM3A5B2  | 17       | 144        | 6               | 138              | 95.83         |
| RM3A5B20 | 19       | 144        | 0               | 144              | 100.00        |
| RM3A5B21 | 14       | 162        | 71              | 91               | 56.17         |
| RM3A5B3  | 42       | 240        | 186             | 54               | 22.50         |
| RM3A5B4  | 14       | 144        | 92              | 52               | 36.11         |
| RM3A5B5  | 20       | 200        | 56              | 144              | 72.00         |
| RM3A5B6  | 10       | 144        | 22              | 122              | 84.72         |
| RM3A5B7  | 21       | 200        | 23              | 177              | 88.50         |
| RM3A5B8  | 17       | 144        | 28              | 116              | 80.56         |
| RM3A5B9  | 20       | 200        | 30              | 170              | 85.00         |
| RM3A6B1  | 15       | 288        | 78              | 210              | 72.92         |
| RM3A6B10 | 25       | 200        | 6               | 194              | 97.00         |
| RM3A6B11 | 5        | 105        | 28              | 77               | 73.33         |
| RM3A6B13 | 26       | 240        | 58              | 182              | 75.83         |
| RM3A6B14 | 26       | 225        | 109             | 116              | 51.56         |
| RM3A6B15 | 23       | 220        | 109             | 111              | 50.45         |
| RM3A6B17 | 43       | 561        | 121             | 440              | 78.43         |
| RM3A6B18 | 20       | 225        | 35              | 190              | 84.44         |
| RM3A6B2  | 24       | 200        | 44              | 156              | 78.00         |
| RM3A6B4  | 15       | 200        | 18              | 182              | 91.00         |
| RM3A6B5  | 1        | 288        | 8               | 280              | 97.22         |
| RM3A6B6  | 11       | 200        | 0               | 200              | 100.00        |
| RM3A6B7  | 18       | 200        | 44              | 156              | 78.00         |
| RM3A6B8  | 16       | 200        | 74              | 126              | 63.00         |
| RM3A6B9  | 28       | 275        | 64              | 211              | 76.73         |
| RM3A7B1  | 29       | 320        | 0               | 320              | 100.00        |
| RM3A7B10 | 4        | 225        | 0               | 225              | 100.00        |
| RM3A7B2  | 6        | 200        | 0               | 200              | 100.00        |
| RM3A7B3  | 22       | 360        | 0               | 360              | 100.00        |
| RM3A7B4  | 37       | 275        | 42              | 233              | 84.73         |
| RM3A7B5  | 16       | 560        | 0               | 560              | 100.00        |
| RM3A7B7  | 11       | 100        | 29              | 71               | 71.00         |
| RM3A7B8  | 12       | 240        | 43              | 197              | 82.08         |
| RM4A1B1  | 38       | 240        | 164             | 76               | 31.67         |
| RM4A1B3  | 68       | 432        | 34              | 398              | 92.13         |
| RM4A1B5  | 30       | 312        | 67              | 245              | 78.53         |
| RM4A2B10 | 9        | 100        | 4               | 96               | 96.00         |
| RM4A2B12 | 7        | 100        | 31              | 69               | 69.00         |
| RM4A2B8  | 18       | 100        | 12              | 88               | 88.00         |
| RM4A3B10 | 15       | 100        | 57              | 43               | 43.00         |
| RM4A3B11 | 14       | 100        | 33              | 67               | 67.00         |
| RM4A3B12 | 10       | 100        | 58              | 42               | 42.00         |
| RM4A3B13 | 14       | 100        | 43              | 57               | 57.00         |
| RM4A3B2  | 24       | 200        | 63              | 137              | 68.50         |
| RM4A3B4  | 11       | 190        | 39              | 151              | 79.47         |
| RM4A3B6  | 31       | 440        | 100             | 340              | 77.27         |
| RM4A3B7  | 23       | 100        | 29              | 71               | 71.00         |
| RM4A3B8  | 37       | 440        | 181             | 259              | 58.86         |
| RM4A3B9  | 11       | 100        | 19              | 81               | 81.00         |
| RM4A4B1  | 21       | 100        | 18              | 82               | 82.00         |
| RM4A4B10 | 18       | 260        | 28              | 232              | 89.23         |
| RM4A4B2  | 34       | 216        | 80              | 136              | 62.96         |
| RM4A4B3  | 13       | 100        | 45              | 55               | 55.00         |
| RM4A4B4  | 6        | 216        | 0               | 216              | 100.00        |
| RM4A4B5  | 14       | 100        | 26              | 74               | 74.00         |
| RM4A4B8  | 14       | 190        | 56              | 134              | 70.53         |
| RM6-2    | 106      | 1440       | 130             | 1310             | 90.97         |
| RM6-3    | 39       | 576        | 42              | 534              | 92.71         |
| RM6A1B1  | 13       | 216        | 67              | 149              | 68.98         |
| RM6A1B10 | 12       | 100        | 43              | 57               | 57.00         |
| RM6A1B11 | 26       | 168        | 118             | 50               | 29.76         |
| RM6A1B12 | 9        | 100        | 22              | 78               | 78.00         |
| RM6A1B14 | 14       | 100        | 18              | 82               | 82.00         |
| RM6A1B16 | 20       | 100        | 62              | 38               | 38.00         |
| RM6A1B2  | 7        | 144        | 0               | 144              | 100.00        |
| RM6A1B3  | 24       | 192        | 41              | 151              | 78.65         |
| RM6A1B4  | 14       | 100        | 29              | 71               | 71.00         |
| RM6A1B5  | 9        | 192        | 0               | 192              | 100.00        |
| RM6A1B6  | 8        | 100        | 44              | 56               | 56.00         |
| RM6A1B7  | 22       | 192        | 32              | 160              | 83.33         |
| RM6A1B8  | 12       | 100        | 13              | 87               | 87.00         |
| RM6A2B1  | 9        | 144        | 0               | 144              | 100.00        |
| RM6A2B11 | 13       | 100        | 31              | 69               | 69.00         |
| RM6A2B13 | 16       | 100        | 41              | 59               | 59.00         |
| RM6A2B15 | 14       | 100        | 16              | 84               | 84.00         |
| RM6A2B2  | 17       | 240        | 44              | 196              | 81.67         |
| RM6A2B3  | 13       | 100        | 24              | 76               | 76.00         |
| RM6A2B4  | 15       | 216        | 51              | 165              | 76.39         |
| RM6A2B5  | 11       | 100        | 19              | 81               | 81.00         |
| RM6A2B6  | 13       | 192        | 45              | 147              | 76.56         |
| RM6A2B7  | 9        | 100        | 41              | 59               | 59.00         |
| RM6A2B8  | 16       | 192        | 92              | 100              | 52.08         |
| RM6A2B9  | 15       | 100        | 29              | 71               | 71.00         |
| RM6A3B1  | 13       | 240        | 34              | 206              | 85.83         |
| RM6A3B10 | 27       | 384        | 58              | 326              | 84.90         |
| RM6A3B2  | 26       | 240        | 0               | 240              | 100.00        |
| RM6A3B3  | 18       | 216        | 62              | 154              | 71.30         |
| RM6A3B4  | 31       | 320        | 23              | 297              | 92.81         |
| RM6A3B6  | 39       | 384        | 54              | 330              | 85.94         |
| RM6A3B8  | 35       | 384        | 0               | 384              | 100.00        |
| RM7A1B1  | 38       | 270        | 80              | 190              | 70.37         |
| RM7A1B11 | 13       | 100        | 27              | 73               | 73.00         |
| RM7A1B3  | 26       | 270        | 69              | 201              | 74.44         |
| RM7A1B5  | 14       | 100        | 36              | 64               | 64.00         |
| RM7A1B7  | 13       | 100        | 14              | 86               | 86.00         |
| RM7A1B9  | 16       | 100        | 0               | 100              | 100.00        |
| RM7A2B10 | 18       | 100        | 0               | 100              | 100.00        |
| RM7A2B12 | 6        | 100        | 38              | 62               | 62.00         |
| RM7A2B2  | 27       | 270        | 11              | 259              | 95.93         |
| RM7A2B4  | 28       | 270        | 72              | 198              | 73.33         |
| RM7A2B6  | 16       | 100        | 45              | 55               | 55.00         |
| RM7A2B7  | 37       | 270        | 56              | 214              | 79.26         |
| RM7A2B8  | 14       | 100        | 0               | 100              | 100.00        |
| RM7A2B9  | 18       | 270        | 55              | 215              | 79.63         |
| RM7A3B1  | 14       | 288        | 0               | 288              | 100.00        |
| RM7A3B2  | 23       | 448        | 41              | 407              | 90.85         |
| RM7A3B3  | 32       | 256        | 0               | 256              | 100.00        |
| RM7A3B5  | 32       | 352        | 117             | 235              | 66.76         |
| RM7A3B6  | 24       | 270        | 89              | 181              | 67.04         |
| RM7A3B7  | 31       | 240        | 65              | 175              | 72.92         |
| RM7A3B8  | 31       | 410        | 29              | 381              | 92.93         |
| RM7A3B9  | 14       | 128        | 82              | 46               | 35.94         |
| RM8A1B1  | 26       | 338        | 97              | 241              | 71.30         |
| RM8A1B3  | 45       | 338        | 153             | 185              | 54.73         |
| RM8A1B4  | 22       | 210        | 0               | 210              | 100.00        |
| RM8A1B5  | 35       | 375        | 50              | 325              | 86.67         |
| RM8A2B5  | 26       | 210        | 19              | 191              | 90.95         |
| RM8A3B2  | 17       | 180        | 0               | 180              | 100.00        |
| RM8A3B4  | 23       | 180        | 0               | 180              | 100.00        |
| RM8A3B6  | 36       | 180        | 57              | 123              | 68.33         |
| RM8A4B1  | 18       | 180        | 39              | 141              | 78.33         |
| RM8A4B3  | 30       | 180        | 14              | 166              | 92.22         |
| RM8A4B4  | 10       | 128        | 33              | 95               | 74.22         |
| RM8A4B5  | 23       | 180        | 78              | 102              | 56.67         |
| RM8A4B6  | 21       | 224        | 78              | 146              | 65.18         |
| RM8A5B2  | 16       | 160        | 0               | 160              | 100.00        |
| RM8A5B4  | 37       | 220        | 152             | 68               | 30.91         |
| RM8A5B6  | 22       | 220        | 45              | 175              | 79.55         |
| RM8A6B1  | 12       | 160        | 19              | 141              | 88.13         |
| RM8A6B2  | 24       | 312        | 35              | 277              | 88.78         |
| RM8A6B3  | 27       | 220        | 107             | 113              | 51.36         |
| RM8A6B4  | 25       | 288        | 78              | 210              | 72.92         |
| RM8A6B5  | 14       | 220        | 19              | 201              | 91.36         |
| RM8A6B6  | 21       | 216        | 46              | 170              | 78.70         |
| RM8A7B5  | 8        | 192        | 24              | 168              | 87.50         |
| RM8A8B2  | 32       | 15         | 0               | 15               | 100.00        |
| RM8A8B6  | 32       | 288        | 21              | 267              | 92.71         |
| RM9A1B1  | 18       | 192        | 43              | 149              | 77.60         |
| RM9A1B2  | 9        | 192        | 5               | 187              | 97.40         |
+----------+----------+------------+-----------------+------------------+---------------+
