+---------------+-------------------------------------------------------------------------------+----------------------+-------+----------+-------------------+
| ITEMCODE      | BINS                                                                          | QTYS                 | QOH   | FINALBIN | POSITIVEBINCOUNTS |
+---------------+-------------------------------------------------------------------------------+----------------------+-------+----------+-------------------+
| FGT           | RM7,NONTIREB,NOBIN,N/A,                                                       | 0,98696,0,-67,-1     | 98628 | NONTIREB | 1                 |
| GYR-176294991 | ZPOREQ,RM4A3B4,RM3A3B16,RM2A1B11,RM1A5B24,RM1A5B15,RM1A3B4,RECDOC,RDA1B4,NSRB | 0,0,5,0,0,0,0,-4,0,4 | 5     | NSRB     | 2                 |
| GYR-407004374 | ZPOREQ,RM2A3B10,RM1A4B8,RECDOC                                                | 0,5,0,-4             | 1     | RM2A3B10 | 1                 |
| MAS-167180007 | ZPOREQ,STAGING,RM7,RM1A3B9,RM1A3B11,NSRB                                      | 0,-4,4,0,0,4         | 4     | NSRB     | 2                 |
| TPA-02151     | ZPOREQ,STAGING,RM8A6B6,RM4A3B4                                                | 0,-3,7,0             | 4     | RM8A6B6  | 1                 |
+---------------+-------------------------------------------------------------------------------+----------------------+-------+----------+-------------------+
