+---------------+------------------------------------------------------------------------------------------------------------------------+---------------------------------+-------+----------+-------------------+
| ITEMCODE      | BINS                                                                                                                   | QTYS                            | QOH   | FINALBIN | POSITIVEBINCOUNTS |
+---------------+------------------------------------------------------------------------------------------------------------------------+---------------------------------+-------+----------+-------------------+
| ARY-ATRT02    | ZPOREQ,RM8A5B4,RM8A3B1,RM7-2,RM4A4B2,RM3A3B5,RM3A3B14,RDA1B3,LOADDOCK                                                  | 0,0,-4,0,0,5,4,0,0              | 5     | RM3A3B14 | 2                 |
| ATR-52010     | ZPOREQ,RM9A1B1,RM3A7B9,RM3A7B7,RM2A4B4                                                                                 | 0,5,0,0,-4                      | 1     | RM9A1B1  | 1                 |
| FGT           | ,N/A,NOBIN,NONTIREB,RM7                                                                                                | -1,-7,0,98696,0                 | 98688 | NONTIREB | 1                 |
| GYR-151093203 | RM8A7B1,RM8A6B5,RM8A1B3,RM8A1B1,RM7A3B7,RM3A7B3,RM3A6B8,RM2A2B4,RM1A4B4,ZPOREQ                                         | -8,0,0,0,16,0,0,0,0,0           | 8     | RM7A3B7  | 1                 |
| GYR-767088673 | RM7-2,RM7A3B2,RM7A3B3,RM7A3B4,RM8A5B3,ZPOREQ,RM6A3B10,RM6A2B3,RM3A4B25,RM1A4B10,RM1A3B7,RM1A2B6,RM1A1B11,RDA1B9,RDA1B6 | 12,0,0,0,-4,0,0,0,0,0,0,0,0,0,0 | 8     | RM7-2    | 1                 |
| HAN-1021507   | RM7A3B4,RM7A3B6,RM8A2B5,STAGING,ZPOREQ,RM4A1B10,RM3A6B9,RM3A2B4,RM2A4B9,RM2A4B8,RM2A1B9,RECDOC,LOADDOCK                | 0,0,0,-1,-2,0,0,0,0,0,8,0,0     | 5     | RM2A1B9  | 1                 |
| IRN-98628     | ,LOADDOCK,NSRB,RECDOC,ZPOREQ                                                                                           | 0,1,7,-7,0                      | 1     | LOADDOCK | 2                 |
| MAS-167018001 | ZPOREQ,RM7,RECDOC,NSRB                                                                                                 | 0,1,-1,1                        | 1     | NSRB     | 2                 |
| MAS-167088004 | NSRB,RECDOC,ZPOREQ                                                                                                     | 4,-1,0                          | 3     | NSRB     | 1                 |
+---------------+------------------------------------------------------------------------------------------------------------------------+---------------------------------+-------+----------+-------------------+
